ALTER TABLE APP_ACT_COE_PAL_UPFILE ADD  SECURITYLEVEL SMALLINT NOT NULL DEFAULT -1;
ALTER TABLE APP_ACT_COE_PAL_REPO_R ADD  SECURITYLEVEL SMALLINT NOT NULL DEFAULT -1;
ALTER TABLE APP_ACT_COE_PAL_REPOSITORY ADD  SECURITYLEVEL SMALLINT NOT NULL DEFAULT -1;